"Conventional" 2D-Display

SAMPLE. 100%=46265, threshold 150. <1% 1-3% 3-5% 5-10% 10-20% 20-40% >40%

m/z scan min

0:00

1:44

3:28

5:12

6:56

8:40

10:24