Default Display

    SAMPLE: Scan 90 (7:48 min) of 132, "RIC": 86311

 m/z

Inty

     156

          169

                 189

                        209

                                 234 249

                                              269

                                                            307

                                                                   327

                                                                          345 361

                                                                                      378